0.0

0.2

0.4

A(T )

0.4 0.6 0.8 T κ = 4 κ = 6 T_{ODT}

T_{ODT}

1.5

2.0

2.5

ϱ_ℓ

0.3 0.35 0.4 0.45 ρ